From 91c7111945e4783edeeb9d13508d5b1df730c15d Mon Sep 17 00:00:00 2001
From: Wolfgang Müller
Date: Fri, 18 Apr 2025 12:35:12 +0200
Subject: frontend: Hide drop-down arrow from <select> in SelectSort

This might be confused with the sort direction and adds a bit too much
visual clutter right next to the sort direction toggle.
---
 frontend/src/lib/toolbar/SelectSort.svelte | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'frontend/src/lib/toolbar/SelectSort.svelte')

diff --git a/frontend/src/lib/toolbar/SelectSort.svelte b/frontend/src/lib/toolbar/SelectSort.svelte
index 5740d6a..cbcbd0e 100644
--- a/frontend/src/lib/toolbar/SelectSort.svelte
+++ b/frontend/src/lib/toolbar/SelectSort.svelte
@@ -40,7 +40,7 @@
 </script>
 
 <div class="rounded-group flex flex-row">
-	<select class="btn-slate" value={sort.on} {onchange} title="Sort by...">
+	<select class="btn-slate appearance-none" value={sort.on} {onchange} title="Sort by...">
 		{#each Object.entries(labels) as [value, label] (value)}
 			<option {value}>{label}</option>
 		{/each}
-- 
cgit v1.2.3-2-gb3c3

