From d297c6310a6a4db8dd7cc3efe6ff59620deadcc0 Mon Sep 17 00:00:00 2001
From: Wolfgang Müller
Date: Sat, 13 Jul 2024 17:29:33 +0200
Subject: frontend/reader: Show loading indicators

Sometimes images may not load fast enough, resulting in the app being
seemingly stuck displaying the same sets of images. Use a timeout to
detect when images take too long to load and show a spinner instead.
---
 frontend/src/lib/reader/Reader.svelte | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'frontend/src/lib/reader/Reader.svelte')

diff --git a/frontend/src/lib/reader/Reader.svelte b/frontend/src/lib/reader/Reader.svelte
index 0b1450a..a8f9440 100644
--- a/frontend/src/lib/reader/Reader.svelte
+++ b/frontend/src/lib/reader/Reader.svelte
@@ -24,7 +24,7 @@
 			</aside>
 		{/if}
 		<main class="relative flex grow">
-			<div class="absolute flex w-full p-1 text-lg [&>*:last-child]:ml-auto">
+			<div class="absolute z-10 flex w-full p-1 text-lg [&>*:last-child]:ml-auto">
 				{#if $$slots.sidebar}
 					<ReaderMenuButton />
 				{/if}
-- 
cgit v1.2.3-2-gb3c3

