From cf817a050a82b526ad230d2677f23f2efd7f3455 Mon Sep 17 00:00:00 2001
From: Wolfgang Müller
Date: Sat, 25 Jan 2025 18:57:33 +0100
Subject: frontend/reader: Revert "Show loading indicators"

This reverts commit d297c6310a6a4db8dd7cc3efe6ff59620deadcc0. It seems
that on slower systems it's actually better without this.
---
 frontend/src/lib/reader/Reader.svelte | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'frontend/src/lib/reader/Reader.svelte')

diff --git a/frontend/src/lib/reader/Reader.svelte b/frontend/src/lib/reader/Reader.svelte
index 15ebdf4..9bc7a82 100644
--- a/frontend/src/lib/reader/Reader.svelte
+++ b/frontend/src/lib/reader/Reader.svelte
@@ -25,7 +25,7 @@
 			</aside>
 		{/if}
 		<main class="relative flex grow">
-			<div class="absolute z-10 flex w-full p-1 text-lg [&>*:last-child]:ml-auto">
+			<div class="absolute flex w-full p-1 text-lg [&>*:last-child]:ml-auto">
 				{#if $$slots.sidebar}
 					<ReaderMenuButton />
 				{/if}
-- 
cgit v1.2.3-2-gb3c3

