From cb1fde27abff3c46ec227a575d6764d593b9c99e Mon Sep 17 00:00:00 2001
From: Wolfgang Müller
Date: Wed, 2 Apr 2025 18:16:34 +0200
Subject: frontend: Use correct page index for aria-label in PageView

---
 frontend/src/lib/reader/PageView.svelte | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'frontend/src/lib/reader/PageView.svelte')

diff --git a/frontend/src/lib/reader/PageView.svelte b/frontend/src/lib/reader/PageView.svelte
index 8e8cfc1..2b61a78 100644
--- a/frontend/src/lib/reader/PageView.svelte
+++ b/frontend/src/lib/reader/PageView.svelte
@@ -109,7 +109,7 @@
 					class:read={index <= lookup[reader.page]}
 					class="group/page relative grow"
 					onclick={() => reader.open(chunk.index)}
-					aria-label={`Open page ${chunk.index}`}
+					aria-label={`Open page ${chunk.index + 1}`}
 				>
 					<SliderTooltip>
 						{@render pagesIn(chunk)}
-- 
cgit v1.2.3-2-gb3c3

